         180           8
   5.00354310530364        4.86780561928612        4.75789643106500     
   4.63467677101240        4.47157614848852        4.38394192098658     
   4.35808325044582        4.24026028954918     
  -35.4459929048608       -35.2867602475387       -35.0343564996542     
  -34.7825002842467       -34.4922845730230       -34.1449649309917     
  -33.7973522208404       -33.3866061292899     
 -3.570808032519971E-003  0.000000000000000E+000
  0.992805726115741       0.000000000000000E+000
  0.995747036290351       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
