         180           8
   5.13272378161471        4.92919602528482        4.79230649576339     
   4.67975179124119        4.53279714064002        4.45949292823400     
   4.43118270366135        4.31746634797426     
  -35.5415165500924       -35.4621373649141       -35.2331281377391     
  -34.8869806534906       -34.6083388505554       -34.2780979733302     
  -33.8274774228489       -33.4576914631041     
 -3.472681133760267E-003  0.000000000000000E+000
  0.992769861603212       0.000000000000000E+000
  0.995871102354448       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
