         180           8
   3.59125220749748        3.21118860001149        2.92642002293238     
   2.62697429046359        2.41094180019962        2.34398326738544     
   2.32107278217998        2.39437976613067     
  -36.2872128083146       -36.5688231649709       -36.7729660648161     
  -37.0814551612613       -37.1884713907928       -36.8682405847683     
  -36.5216075015916       -36.2965917968069     
 -3.139324915842034E-003  0.000000000000000E+000
  0.992252495016440       0.000000000000000E+000
  0.995400321196043       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
