         180           8
   3.82998847692970        3.48451971317996        3.06449288612834     
   2.75170553792926        2.57444632391370        2.43142657191671     
   2.23004233881079        2.25085747370356     
  -34.8872741862326       -35.0586708691569       -35.3649371168723     
  -35.5269231734896       -35.6813336246139       -35.8322374858266     
  -36.0738228621853       -36.2397671925324     
 -3.109071766045158E-003  0.000000000000000E+000
  0.992683557221345       0.000000000000000E+000
  0.995801142193566       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
