         180           8
   6.81307558221782        6.16740385462403        5.49452431322581     
   4.87479314441585        4.24737127092971        3.64907772781254     
   3.07541055402253        2.61347991760765     
  -28.9305736575563       -29.0864304071142       -29.2541520349302     
  -29.4751403645249       -29.7556874063577       -30.0768792311684     
  -30.2806540723619       -30.3124599804201     
 -3.228033978691320E-003  0.000000000000000E+000
  0.992392614147777       0.000000000000000E+000
  0.995165350189569       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
