         180           8
   8.91935947046397        8.24321544874931        7.56225525613981     
   6.92346106453433        6.31480710688720        5.71246519169245     
   5.16030185110551        4.61280259630713     
  -28.3260430294570       -28.4660058809542       -28.5650961307393     
  -28.7387607394776       -28.9987391749695       -29.2421852034221     
  -29.4608184387725       -29.6286650950882     
 -3.640920527141146E-003  0.000000000000000E+000
  0.992881001919757       0.000000000000000E+000
  0.995997903701597       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
