         180           3
   14.0425653695670        11.9761832031030        9.89910656447525     
   1.59764577093051        2.04423942980853        2.55414995633692     
 -2.676138607370673E-003  0.000000000000000E+000
   1.00197513247014       0.000000000000000E+000
  0.999047560250994       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
