         180           8
   8.97102471101460        8.41141666477122        7.75346638819712     
   7.13101135050056        6.49852232854465        5.93466607677423     
   5.37393882174428        4.91851221795578     
  -28.1741178240916       -28.2723467130822       -28.3360224817556     
  -28.5093763811696       -28.7617316055552       -28.9963244525433     
  -29.2135607601255       -29.4426091750171     
 -3.454612417189298E-003  0.000000000000000E+000
  0.992429671087600       0.000000000000000E+000
  0.995634442331064       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
