         180           8
   9.02875744563137        8.30838949465606        7.66205433247364     
   7.01547645286949        6.40687689994323        5.88291304717431     
   5.33705112036523        4.84619519891768     
  -28.1880509447766       -28.2595276258786       -28.3743878655330     
  -28.4384716304150       -28.6005649251237       -28.8557385248155     
  -29.1432952928028       -29.2979904206091     
 -3.477454225429004E-003  0.000000000000000E+000
  0.992510763240024       0.000000000000000E+000
  0.995534029023984       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
