         180           8
   8.99261796484188        8.32053104053385        7.68459625440399     
   7.03871425593713        6.41405417715534        5.82272109443824     
   5.22668060735828        4.78259356281444     
  -28.0743623434065       -28.2905641865881       -28.4654573370112     
  -28.6657422703231       -28.8801389607117       -29.0962801184514     
  -29.2491746565829       -29.3606251772520     
 -3.426981189955605E-003  0.000000000000000E+000
  0.992415576183203       0.000000000000000E+000
  0.995512591661878       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
