         180           8
   9.14567796815357        8.45720129982190        7.81581467252211     
   7.18568764615757        6.58685456712321        6.03470873579134     
   5.46628869879490        4.89526119664302     
  -28.2237239201649       -28.2176439644076       -28.3486228546106     
  -28.5528629687382       -28.7412353067997       -28.9125920032680     
  -29.1722445411361       -29.4377564785512     
 -3.613699055483736E-003  0.000000000000000E+000
  0.992487325414877       0.000000000000000E+000
  0.995642734270626       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
