         180           8
   9.28929846743524        8.51722685805737        7.87992367262431     
   7.25618669763155        6.66461953627257        6.08837022483743     
   5.52945812388309        5.01078561178810     
  -28.6648982920013       -28.7012926885320       -28.8341277651281     
  -29.0478213558356       -29.3078139489523       -29.5513344165500     
  -29.7430059622074       -29.9936529867247     
 -3.617180778280747E-003  0.000000000000000E+000
  0.992473386661119       0.000000000000000E+000
  0.995557459380236       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
