         180           8
   9.24710144031073        8.55868426064316        7.96258785463685     
   7.31063650685747        6.64107786350243        6.05999548513902     
   5.49326895440556        4.98294095285889     
  -28.7827335665675       -28.7486267719050       -28.8397091566124     
  -29.0441991597539       -29.3108947645787       -29.5528149533870     
  -29.7976295814715       -30.0119774538954     
 -3.585477127563273E-003  0.000000000000000E+000
  0.992348187973067       0.000000000000000E+000
  0.995502505025735       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
