         180           8
   9.61647588758694        8.93888939057025        8.25167057213648     
   7.60021108633850        7.00985762386236        6.47204460725296     
   5.89406403591244        5.39878053172876     
  -29.6062434481293       -29.7763600369019       -29.9255213374653     
  -30.0039297943938       -30.1292520576590       -30.3907705811127     
  -30.6842734164773       -30.8953673094454     
 -3.880539016244064E-003  0.000000000000000E+000
  0.992991201484223       0.000000000000000E+000
  0.996431137570165       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
