         180           3
   14.5670274469948        12.3987038774528        10.3039481054198     
  0.158961921365359       0.828756919043568        1.42152570826872     
 -2.708968438945870E-003  0.000000000000000E+000
   1.00200347904362       0.000000000000000E+000
  0.999093676751607       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
