         180           8
   9.77611451181457        9.09372425781218        8.40058725358796     
   7.76188433230834        7.14186674614503        6.49812772939101     
   5.88215850323002        5.31501191468443     
  -30.5878063581038       -30.7697688993194       -30.9628107145376     
  -31.1238869017756       -31.3633338959554       -31.6246864497343     
  -31.7746791722411       -31.9965225055605     
 -4.104336476890166E-003  0.000000000000000E+000
  0.993082976339743       0.000000000000000E+000
  0.996463093563005       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
