         180           8
   9.81042912459968        9.07653578556888        8.42368248912256     
   7.77528679731172        7.18573216229890        6.58854050480587     
   5.95857210524862        5.41403583442336     
  -30.8217315354305       -30.9553374188457       -31.0788694896798     
  -31.2648449563644       -31.4809601980516       -31.6881434438716     
  -31.8766806475810       -31.9715761032441     
 -4.044016225774338E-003  0.000000000000000E+000
  0.993196806968143       0.000000000000000E+000
  0.996312070115615       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
