         180           8
   3.62669114357958        3.33855787874957        3.01404082397880     
   2.77999358518111        2.56438837057015        2.43469149873979     
   2.37151900539872        2.31622501557332     
  -34.9574112504568       -35.2004520125234       -35.3765450463775     
  -35.6123638218838       -36.0215719127661       -36.3975665694386     
  -36.7047838214922       -36.9125390958836     
 -3.836185697880677E-003  0.000000000000000E+000
  0.992565221037703       0.000000000000000E+000
  0.995556696874624       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
