         180           8
   4.55278754681905        4.28099813071829        3.95491595158368     
   3.68039846265916        3.45728117809565        3.22048625515227     
   3.04087984306751        2.76840080839217     
  -35.0229608138869       -35.1543914433840       -35.5121635234576     
  -35.7356560139752       -36.0524474707656       -36.4629165374917     
  -36.8388739310944       -37.4244896956509     
 -3.745680720738353E-003  0.000000000000000E+000
  0.993178391626775       0.000000000000000E+000
  0.996535952252211       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
