         180           8
   6.76430164964517        6.43879018405011        6.09057713214024     
   5.76356149511375        5.49370658553782        5.26470804588221     
   5.11961635162273        5.08437642099574     
  -37.0748178141984       -37.4302568688975       -37.7096301741538     
  -37.9395043057187       -38.1701957142935       -38.4204559211759     
  -38.6919948691632       -39.0386789418498     
 -4.056733088255648E-003  0.000000000000000E+000
  0.993050255795393       0.000000000000000E+000
  0.996435203559033       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
