         180           8
   3.03507530470929        2.38713578455129        1.71006976919119     
   1.04898504569532       0.432691042865254      -0.164005347883502     
 -0.725588752361325       -1.26049251265850     
   2.93641408064725        2.91626631827309        2.83030300716240     
   2.70989518030995        2.52461575069736        2.33123164103712     
   2.15797514052682        1.94850637170312     
 -3.933114320632976E-003  0.000000000000000E+000
  0.993199802499639       0.000000000000000E+000
  0.996256099624855       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
