         180           8
   3.03818108021290        2.33674801413153        1.70353474558130     
   1.08270360631100       0.448369454198620      -0.105871520176136     
 -0.646127060028405       -1.24970010038111     
   2.75110338832243        2.62165075598322        2.55906450209580     
   2.50250695007706        2.41763338022006        2.28561738689704     
   2.10354146631165        2.00928480511978     
 -3.949496836585146E-003  0.000000000000000E+000
  0.993152300305520       0.000000000000000E+000
  0.996182942984820       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
