         180           8
   1.51298585990678       0.786245149479166       0.161315274960890     
 -0.461188469116757       -1.03335615682975       -1.63446738610665     
  -2.21071941455692       -2.71266864372546     
   3.39011022617995        3.32477033099521        3.26204302791817     
   3.13212061855449        2.96254917085670        2.79225131241940     
   2.63442554641798        2.46938735837709     
 -3.978506511789472E-003  0.000000000000000E+000
  0.993048814124137       0.000000000000000E+000
  0.996010918114619       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
