         180           8
  -5.35096378877033       -5.61113526733711       -5.89136525418865     
  -6.13737890565289       -6.37605200522705       -6.60469216027943     
  -6.84668250790358       -6.98573033390308     
  0.322872178506807       0.234682331469206       3.164556244626133E-002
 -0.112335819753308      -0.338260583881024      -0.809451148312596     
  -1.13999745554433       -1.22064324181712     
 -4.003828711865587E-003  0.000000000000000E+000
  0.993219669698861       0.000000000000000E+000
  0.996435539763710       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
