         180           8
   7.70422734280463        7.36105267505096        6.94483703555966     
   6.55965015409936        6.22318288188373        5.93994595302648     
   5.71751760405956        5.66278683229622     
   1.75916816508522        1.86505590181226        1.87237215745065     
   1.89019378633049        1.85478702322245        1.48468115510137     
  0.946384286079252       0.753257592428563     
 -3.174061284154879E-003  0.000000000000000E+000
   1.00206062114497       0.000000000000000E+000
  0.999013060141051       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
