         180           8
   1.88524325620011        1.19774671431673       0.520692840515543     
 -0.148203738588010      -0.756220600000263       -1.35435514748872     
  -1.96957195804906       -2.45768188976053     
   3.07705385117280        2.97294919985401        2.82682865367545     
   2.67793504450179        2.49830387080147        2.29502690878262     
   2.08343045439501        1.88719121696501     
 -3.920818226810909E-003  0.000000000000000E+000
  0.992896300847846       0.000000000000000E+000
  0.995908949946373       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
