         180           8
  -1.38994180215647       -1.60558243407326       -1.73250576224386     
  -1.85617694060516       -1.96052516950620       -2.05350496807479     
  -2.14164284506712       -2.17851122065500     
  0.880980559122894       0.977672490497193        1.24015218355735     
   1.47130110330720        1.76295694995880        2.02056688223092     
   2.26302178932530        2.41522011593649     
 -3.765029551110032E-003  0.000000000000000E+000
  0.992798276794966       0.000000000000000E+000
  0.995493870769426       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
