         180           8
   7.00990798270370        7.46110913410986        7.95672047572128     
   8.52342050761943        9.07654872191669        9.63117497583638     
   10.2081691538811        10.7111613639924     
   1.25036948846206        1.44011853591365        1.62324954057070     
   1.78683510966073        1.92253480223286        2.03446633169412     
   2.23090322675412        2.39736939038744     
 -2.826844435540505E-003  0.000000000000000E+000
   1.00223884108576       0.000000000000000E+000
  0.998968217473033       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
