         180           8
   38.6912632963140        37.8445806418377        36.8222673176276     
   35.8866716559905        34.9831892957483        34.1303537589233     
   33.2942526378400        32.5037103003095     
   11.2500546955760        11.1238412788206        10.9812644742602     
   10.7506901217925        10.5387096459388        10.3103066310056     
   10.0868106761618        9.91984922546121     
  1.614462658941316E-002  0.000000000000000E+000
  0.980873529114112       0.000000000000000E+000
  0.984444048650295       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
