         180           8
   4.38294672016632        3.73359324816971        2.96839111698209     
   2.23703719368494        1.44405571034683       0.663222276218645     
  8.480330763098565E-003 -0.673387411988934     
   8.89255473676106        8.91861866297260        9.01867876786051     
   9.09148330440214        9.20885980375720        9.15496474939636     
   9.16979445230429        9.37108475074471     
  1.608337963691080E-002  0.000000000000000E+000
   1.00518888661095       0.000000000000000E+000
   1.00146666013276       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
