         180           8
   4.03019040917434        2.88048466100018        1.98130213690254     
   1.12708755633434       0.301745817141633      -0.500751842592072     
  -1.32069079573653       -2.06190350040376     
   9.91647060505112        9.87181626337357        9.69198498679267     
   9.46184953696598        9.18918794115615        8.93531818089071     
   8.69229815924976        8.39962726637909     
  2.381032025418448E-002  0.000000000000000E+000
  0.976451468384843       0.000000000000000E+000
  0.978200510359661       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
