         180           8
   3.37071202820952        2.40044703445185        1.47778049374019     
  0.626032549521210      -0.205802225189323       -1.04082428344924     
  -1.88011008642969       -2.56411987907733     
   10.1529767145937        10.1103510599104        10.0296591930045     
   9.86515346920416        9.61861293291237        9.33246321824822     
   9.08933109130013        8.83439491737123     
  2.395205226355749E-002  0.000000000000000E+000
  0.976754126535194       0.000000000000000E+000
  0.976547509457562       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
