         180           8
   3.36758425819668        2.46878053781589        1.55535984270524     
  0.783896837478726      -4.198143324401573E-002 -0.916622803966640     
  -1.68280921130175       -2.46620177580062     
   10.2434049058057        10.1143954166461        9.96551154460057     
   9.82598117976675        9.69071641724146        9.40431239843338     
   9.05198587536006        8.80855258081191     
  2.399280006376837E-002  0.000000000000000E+000
  0.976583255740450       0.000000000000000E+000
  0.976153602280152       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
