         180           3
   3.61846182984839       0.451575489570689       -2.24641525865184     
   4.51561414165017        4.75660953211641        4.66704864203627     
  2.186467278408278E-002  0.000000000000000E+000
   1.00230908426098       0.000000000000000E+000
  0.996071844290009       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
