         180           8
   12.2477182080125        11.6616188940330        11.1247995264638     
   10.5809477265586        10.1203893414358        9.65328373524663     
   9.24465347433021        8.75190761308274     
  -1.02723855040060       -1.09011476366619       -1.17232889561038     
  -1.34366334745198       -1.58213778001909       -1.82566032698578     
  -2.05917616051008       -2.25434691650808     
 -2.189297187325528E-002  0.000000000000000E+000
   1.01254542599589       0.000000000000000E+000
   1.01752789541328       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
