         180           3
  -16.7501411773984       -18.6290904804961       -20.2168627927071     
   5.71504326843928        5.32320446106307        5.07473948625948     
  4.809063844298439E-003  0.000000000000000E+000
  0.988653833519675       0.000000000000000E+000
  0.986063655867296       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
