         180           8
   11.2402445249303        10.9996684632247        10.8915285507643     
   10.8094185667837        10.8839693549639        11.0818063484416     
   11.1924416083309        11.2453150529280     
  -6.18008271427179       -6.62965492134438       -7.18730874195152     
  -7.83918113363278       -8.72813481383059       -9.62633915620757     
  -10.1530766322007       -10.5921959408070     
 -2.139727429744620E-002  0.000000000000000E+000
   1.01043285081558       0.000000000000000E+000
   1.01687756574453       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
