         180           3
  -24.2430994294504       -26.0407281620990       -27.2228854714561     
  6.291349436232181E-002  0.248859541391312       0.541441755632969     
  5.317249028737803E-003  0.000000000000000E+000
  0.988523594304710       0.000000000000000E+000
  0.985958624899023       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
