         180           8
   14.5548155051227        13.9577460980782        13.3298899306393     
   12.6475475050367        12.0212486342082        11.4594816468029     
   10.9385929390079        10.4783446223682     
  -1.52762134467111       -1.66639863335585       -1.81502274037196     
  -2.01515133506705       -2.27152250890967       -2.54899470652314     
  -2.78065043376108       -3.00421339942727     
 -2.178161564758186E-002  0.000000000000000E+000
   1.01108859610505       0.000000000000000E+000
   1.01739063067806       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
