         180           3
  -16.4993259720512       -18.5249136725377       -20.7113455014574     
   3.14417503798585        2.53933643478690        2.44605798826185     
  5.180093121969738E-003  0.000000000000000E+000
  0.988551238698258       0.000000000000000E+000
  0.986012672965199       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
