         180           8
   12.1756989338619        11.5739710092215        11.0665813647025     
   10.5784142729256        10.2485304530800        9.58666055677313     
   7.98206903468373        6.61610802721499     
  -1.60638018664501       -1.65273278834472       -1.58040615710212     
  -1.70440715172460       -1.76587944485687      -0.705806930856961     
   1.14951277131593        2.26720868547061     
 -2.185747249408973E-002  0.000000000000000E+000
   1.01066529575711       0.000000000000000E+000
   1.01708719211945       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
