         180           3
  -16.8454843418246       -18.0181123692459       -22.2340650411797     
   5.18399486416493        4.85590189935850        10.0435629680860     
  4.763113648028654E-003  0.000000000000000E+000
  0.988464552313100       0.000000000000000E+000
  0.985896990767115       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
