         180           8
   18.7303374830497        18.1346637372014        17.5596537358725     
   16.9319214616205        16.3210394002161        15.6718963510476     
   15.0135542956217        14.3609804726053     
  -1.80145040067970       -2.09092821268834       -2.22075380798033     
  -2.35160890748323       -2.59811007416978       -2.87742111201599     
  -3.15920419738863       -3.41219655397313     
 -2.139236460907329E-002  0.000000000000000E+000
   1.01120349842191       0.000000000000000E+000
   1.01785144492811       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
