         180           3
  -16.2682021131122       -18.0835546432160       -20.4846868328675     
   2.03673065857114       0.912408205785300       0.261080099316215     
  5.657967489106947E-003  0.000000000000000E+000
  0.988653268058949       0.000000000000000E+000
  0.985801455222406       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
