         180           8
   6.40801942992057        6.24281351503389        6.12001315857718     
   5.99959074146736        6.00194817050382        5.93910059414064     
   5.88278147908592        6.05891109802660     
   26.0989238864819        25.5558533756643        24.9920064205596     
   24.3240100896230        23.2235076615917        22.5048954140026     
   21.9668379812761        10.5045402456357     
 -2.202075812361915E-002  0.000000000000000E+000
   1.00829701936598       0.000000000000000E+000
   1.01456161536598       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
