         180           8
  -21.3962824921551       -21.8806852709521       -22.3641649143593     
  -22.8260934124494       -23.3884299635914       -24.1021895650287     
  -24.5345364215086       -24.7150546596403     
   8.42084896424957        8.40600194434965        8.45625386914935     
   8.35379774983083        8.28226973375674        8.69987793085568     
   9.22778419849321        10.1965207306269     
  5.140221524016882E-003  0.000000000000000E+000
  0.986626853358500       0.000000000000000E+000
  0.983882572256555       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
