         180           8
   9.63485552963464        9.28085309755516        7.86635564384833     
   6.65211764533405        5.90278151068197        5.22767112425261     
   4.57158948179305        3.87555788710928     
   30.2438904500080        31.0013385320559        32.7578909016326     
   33.8210026515706        34.2567569565179        34.7667984301527     
   35.4973347418943        35.9283281248810     
 -2.241983883446945E-002  0.000000000000000E+000
   1.00897763059168       0.000000000000000E+000
   1.01549106864717       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
