         180           8
  -13.5937943442440       -13.9817553167754       -15.3255396948891     
  -16.4991099837493       -17.2877247671193       -18.1765996149699     
  -19.0430556502316       -19.8811010547307     
   10.7497258221456        11.4657715325677        13.2245293149348     
   14.2038768944016        14.5481238249546        15.3346165297872     
   16.6278947061203        17.4320853127743     
  5.116180470381708E-003  0.000000000000000E+000
  0.986705651614196       0.000000000000000E+000
  0.983773341500289       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
