         180           8
   5.96970753303932        5.75226278617561        5.51655225046837     
   5.38868065972271        5.47070526503599        5.27837676656277     
   4.50123972011571        3.65604525783862     
   26.2038486105773        25.8231057012734        25.1831454735683     
   24.1613103751210        23.0622613346624        23.0988555383148     
   24.3835459044551        21.1196526342272     
 -2.198861068390730E-002  0.000000000000000E+000
   1.00844696710400       0.000000000000000E+000
   1.01436073185039       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
