         180           8
  -21.5523264649992       -22.2410702352826       -22.8770339408199     
  -23.4299253785566       -23.9981846769418       -24.9209594655160     
  -26.1027441387444       -27.2450405171379     
   11.2571536882428        11.6890408635669        11.9595409781117     
   11.8531780559918        12.0116669703367        13.4352753723399     
   15.7807391497741        17.8283722347540     
  4.995172668341851E-003  0.000000000000000E+000
  0.986514449100728       0.000000000000000E+000
  0.983887519815174       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
